---
title: "Self-Hosting Configuration"
sidebarTitle: "Configuration"
description: "Every environment variable the self-hosted server understands."
icon: "settings"
---

The self-hosted server aims for **zero configuration** — the only required input is one LLM provider key, which the first-boot wizard collects interactively (or set via env var for non-interactive deployments). Embeddings default to local English; you can pick another provider in the optional wizard step or via env. Everything else below is opt-in.

The installer writes API keys to `~/.supermemory/env`, which is loaded on every launch. You can also set variables in your shell or a process manager.

## Core

| Variable | Purpose | Default |
|---|---|---|
| `PORT` (or `SUPERMEMORY_PORT`) | HTTP listen port | `6767` |
| `SUPERMEMORY_DATA_DIR` | Where the graph engine's data, auth secret, and model cache live | `./.supermemory` |

## LLM providers

In production, Supermemory uses its own proprietary models tuned for long-horizon data understanding. Self-hosted, you bring your own LLM for the intelligent steps — summaries, contextual chunking, and memory extraction. Embeddings default to a local model (no API key) and can optionally use OpenAI, Gemini, or Ollama — see [Embeddings](/self-hosting/embeddings). Configure **at least one** LLM provider:

| Variable | Provider |
|---|---|
| `OPENAI_API_KEY` | OpenAI — or any OpenAI-compatible endpoint, see below |
| `ANTHROPIC_API_KEY` | Anthropic |
| `GEMINI_API_KEY` | Google AI Studio (Gemini) |
| `GROQ_API_KEY` | Groq |
| `WORKERS_AI_API_KEY` + `CLOUDFLARE_ACCOUNT_ID` | Cloudflare Workers AI |
| `GOOGLE_VERTEX_PROJECT_ID` + `GOOGLE_VERTEX_LOCATION` | GCP Vertex AI |

<Tip>
No key set? The server walks you through it. On first boot, an interactive setup wizard asks which provider you want, securely prompts for the key, and saves it encrypted — including a custom base URL and model name if you pick an OpenAI-compatible endpoint.
</Tip>

With multiple providers configured, the first one in the order above is used.

<Note>
Image, video, and high-fidelity PDF understanding require a Gemini or Vertex AI key. Text ingestion, memory extraction, and search work with any provider.
</Note>

### Fully offline with local models

`OPENAI_API_KEY` + `OPENAI_BASE_URL` covers any OpenAI-compatible endpoint: Ollama, LM Studio, vLLM, llama.cpp server, Together, Fireworks, and more.

```bash
# Ollama example — gpt-oss-20b works great
OPENAI_BASE_URL=http://localhost:11434/v1
OPENAI_API_KEY=ollama        # any non-empty string for local runners
OPENAI_MODEL=gpt-oss:20b
```

| Variable | Purpose | Default |
|---|---|---|
| `OPENAI_BASE_URL` | OpenAI-compatible endpoint URL | OpenAI |
| `OPENAI_MODEL` | Model ID sent to that endpoint | `gpt-5.1` |
| `OPENAI_FAST_MODEL` | Override for fast/light tasks | `OPENAI_MODEL` |
| `OPENAI_TEXT_MODEL` | Override for heavier text tasks | `OPENAI_MODEL` |

## File storage

Nothing to configure. Uploaded files (PDFs, images) are stored on local disk inside `$SUPERMEMORY_DATA_DIR` and served by the server at `/files/:key`.

## Embeddings

By default, vectors are computed locally with `Xenova/bge-base-en-v1.5` (768d) — no embedding API key. On interactive first boot you can pick a different provider after the LLM key step; for Docker/CI set env vars instead.

Full provider table, multilingual guidance, remote examples (OpenAI / Gemini / Ollama), and the re-ingestion / dimension-lock warning: **[Embeddings (self-hosted)](/self-hosting/embeddings)**.

| Variable | Purpose | Default |
|---|---|---|
| `SUPERMEMORY_EMBEDDING_PROVIDER` | `local`, `openai`, `gemini`, or OpenAI-compatible remote | `local` |
| `SUPERMEMORY_EMBEDDING_MODEL` | Model id for the chosen provider | `Xenova/bge-base-en-v1.5` |
| `SUPERMEMORY_EMBEDDING_DIMENSIONS` | Vector size; must match model and stored data | `768` |
| `SUPERMEMORY_EMBEDDING_BASE_URL` | Base URL for OpenAI-compatible embedding APIs | unset |

### Embedding performance

Local embeddings are prewarmed at startup with conservative defaults — one worker, minimal CPU footprint. Turn these up if you're ingesting heavily and prefer throughput over headroom (remote embedding providers ignore these — there's no local worker pool to tune):

| Variable | Purpose | Default |
|---|---|---|
| `SUPERMEMORY_LOCAL_EMBEDDING_POOL_SIZE` | Number of embedding workers | `1` |
| `SUPERMEMORY_LOCAL_EMBEDDING_WASM_THREADS` | Compute threads per worker | `1` |
| `SUPERMEMORY_LOCAL_EMBEDDING_BATCH_SIZE` | Texts per worker dispatch | `8` |
| `SUPERMEMORY_LOCAL_EMBEDDING_IDLE_TIMEOUT_MS` | Idle time before workers shut down | `120000` |
| `SUPERMEMORY_SKIP_EMBEDDING_PREWARM` | Skip startup prewarm, load on first use | unset |

## Memory limits & ingestion queue

The server manages memory for you and separates the two kinds of work you send it:

- **Searches are always served immediately.** They never wait behind ingestion, regardless of how much is queued.
- **Adds are accepted instantly but processed through a queue.** A `POST /v3/documents` call returns in milliseconds with status `queued`; extraction, embedding, and indexing happen in the background at a controlled pace.

Ingestion may grow the server's memory usage by at most `SUPERMEMORY_EMBEDDING_RAM_LIMIT` (default **1 GB**) above its post-boot baseline. Past that, new documents simply wait in the queue until memory drops back under the limit — nothing is dropped, ingestion just slows down. The limit is measured above the boot baseline because the built-in local embeddings and storage engine have a fixed footprint that exists before any document is processed.

The limit is printed at boot, and whenever adds are waiting the binary shows a live status line in the terminal:

```
[ingest] memory limit 1.0 GB above baseline (1.6 GB) · 2 concurrent — set SUPERMEMORY_EMBEDDING_RAM_LIMIT=ngb to change
[ingest] 2 running · 193 queued · 0.4 GB / 1.0 GB ingest memory
[ingest] 2 running · 193 queued · paused — 1.1 GB / 1.0 GB ingest memory, waiting for it to drop
[ingest] resumed — memory back under the 1.0 GB ingest limit
```

| Variable | Purpose | Default |
|---|---|---|
| `SUPERMEMORY_EMBEDDING_RAM_LIMIT` | Memory ingestion may use above the boot baseline. Accepts `1gb`, `1.5gb`, `512mb`, or a bare number (GB). | `1gb` |
| `SUPERMEMORY_INGEST_CONCURRENCY` | Documents processed concurrently | `2` |

```bash
# Give ingestion 4 GB of headroom on a larger machine
SUPERMEMORY_EMBEDDING_RAM_LIMIT=4gb ./supermemory-server
```

Raise the limit and concurrency on machines with spare RAM for faster bulk imports; lower them on small VPSes where you want the server to stay lean and don't mind adds draining slowly.

## Telemetry

The self-hosted binary sends no analytics — there is nothing to opt out of. The only related switch:

| Variable | Purpose | Default |
|---|---|---|
| `SUPERMEMORY_DISABLE_TELEMETRY` | Set to `1` to also disable internal AI SDK telemetry instrumentation | unset |

## Platform-only features

These exist in the codebase but are exclusive to the [hosted platform](https://console.supermemory.ai) — the self-hosted binary doesn't include them:

- **Connectors** — Google Drive, Notion, Gmail, OneDrive background sync
- **Supermemory MCP** — managed MCP server endpoints
- **Optimized memory extraction** — the platform's extraction pipeline is tuned for higher quality at lower cost than bring-your-own-key
- **Managed scale** — globally distributed infrastructure, no capacity planning

Any other environment variables you may find referenced in the codebase are platform-only: the self-hosted binary ignores them even when set.

## Example: production-ish `.env`

```dotenv
# Persistent data location
SUPERMEMORY_DATA_DIR=/var/lib/supermemory

# One LLM provider (required for extraction)
OPENAI_API_KEY=sk-...

# Optional — omit to keep local Xenova/bge-base-en-v1.5 (768d)
# SUPERMEMORY_EMBEDDING_PROVIDER=openai
# SUPERMEMORY_EMBEDDING_MODEL=text-embedding-3-small
# SUPERMEMORY_EMBEDDING_DIMENSIONS=1536
```

That's enough for full ingestion, memory extraction, and hybrid search with the default local embeddings.
