---
title: "API Overview"
description: "Introduction to the Fabro REST API"
---

<Warning>
The Fabro API is **under active development** and may be subject to change. Endpoints, request/response formats, and authentication mechanisms may evolve as the project matures.
</Warning>

The Fabro API is a REST API for managing workflow runs, interactive sessions, and related resources. All requests and responses use JSON.

## Base URL

By default, `fabro server start` listens on the Unix socket `~/.fabro/fabro.sock`. If you bind Fabro to TCP instead, the versioned API is served at a URL like:

```
http://localhost:3000/api/v1
```

The advertised public API URL is configurable via `settings.toml`:

```toml title="settings.toml"
[server.api]
url = "https://fabro.example.com/api/v1"
```

## Authentication

Fabro configures server auth with bootstrap methods:

```toml title="settings.toml"
[server.auth]
methods = ["dev-token", "github"]

[server.auth.github]
allowed_usernames = ["alice", "bob"]
```

Protected `/api/v1/*` routes always accept:

- `Authorization: Bearer <token>`
- the browser session cookie when the web UI is enabled

If both are present, the `Authorization` header wins.

### Dev Token

When `"dev-token"` is enabled, the API accepts the raw dev token directly as a bearer credential:

```
Authorization: Bearer fabro_dev_...
```

This is the simplest way to make ad hoc local requests with `curl` or a script. The dev token is also available as a web login method when the web UI is enabled.

### GitHub OAuth

When `"github"` is enabled, browser users can sign in through GitHub OAuth. Successful logins mint a server-issued session cookie that the browser automatically sends on subsequent API requests.

`[server.auth.github].allowed_usernames` restricts which GitHub usernames may complete login.

### Browser Sessions

When `[server.web].enabled = true`, the server requires `SESSION_SECRET` and issues a private `__fabro_session` cookie after successful login. The cookie is session transport only; the underlying bootstrap method remains `dev-token` or `github`, and that provenance is preserved in run metadata.

### HTTPS and Reverse Proxies

Fabro's listener is plain HTTP (or a Unix socket) only. If you want a public HTTPS endpoint, terminate TLS at a reverse proxy, load balancer, or platform ingress and point it at Fabro's internal listener.

## Errors

### Error Shape

All error responses share a consistent JSON structure:

```json
{
  "errors": [
    {
      "status": "404",
      "title": "Not Found",
      "detail": "Run abc123 not found."
    }
  ]
}
```

Each entry in the `errors` array contains:

| Field | Type | Description |
|-------|------|-------------|
| `status` | `string` | The HTTP status code as a string |
| `title` | `string` | The canonical reason phrase for the status code |
| `detail` | `string` | A human-readable explanation of the error |

### HTTP Status Codes

| Status | Meaning | When It Occurs |
|--------|---------|----------------|
| `400 Bad Request` | The request body or parameters are invalid | Missing required fields, malformed JSON |
| `401 Unauthorized` | Authentication is missing or invalid | No token, invalid dev token, or missing/expired session |
| `403 Forbidden` | The authenticated user lacks access | Username not in the allowed list |
| `404 Not Found` | The requested resource does not exist | Unknown run ID, unknown workflow name |
| `409 Conflict` | The resource is in a conflicting state | Answering a question on a run that isn't running yet |
| `410 Gone` | The resource is no longer available | SSE event stream has closed |
| `501 Not Implemented` | The endpoint exists but is not yet implemented | Placeholder routes |
| `502 Bad Gateway` | An upstream dependency failed | An upstream service returned an error |

## Pagination

List endpoints that return large collections use offset-based pagination. Pass pagination parameters as query strings:

| Parameter | Type | Default | Description |
|-----------|------|---------|-------------|
| `page[limit]` | `integer` | `20` | Maximum number of items to return (clamped to 1–100) |
| `page[offset]` | `integer` | `0` | Number of items to skip |

Paginated responses include a `meta` object alongside the `data` array:

```json
{
  "data": [...],
  "meta": {
    "has_more": true
  }
}
```

When `has_more` is `true`, increment the offset by the limit to fetch the next page.

## Versioning

The Fabro API is versioned under `/api/v1`. All versioned endpoints, including the OpenAPI document, live under that prefix. Future breaking changes can be introduced under a new versioned prefix while preserving existing clients.

## Discovery

The root endpoint (`GET /`) returns discovery URLs. The health endpoint (`GET /health`) can be used for liveness checks. The OpenAPI spec is available at `GET /api/v1/openapi.json`.
